From 02891812b01888aba3eada58d6051a80a79c1a18 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Tue, 29 Jan 2019 21:48:52 -0500
Subject: flexLayout fixes, but flexlayout seems hopelessly broken once it gets
 scaled.

---
 src/Main.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/Main.tsx')

diff --git a/src/Main.tsx b/src/Main.tsx
index 566216373..c636ee42e 100644
--- a/src/Main.tsx
+++ b/src/Main.tsx
@@ -61,7 +61,7 @@ runInAction(() => {
     let doc5 = Documents.ImageDocument("https://upload.wikimedia.org/wikipedia/commons/thumb/3/3a/Cat03.jpg/1200px-Cat03.jpg", {
         x: 650, y: 500, width: 600, height: 600
     });
-    let docset2 = new Array<Document>(doc1, doc4, doc3);
+    let docset2 = new Array<Document>(doc4, doc1, doc3);
     let doc6 = Documents.DockDocument(docset2, {
         x: 350, y: 100
     });
-- 
cgit v1.2.3-70-g09d2

