From 8d424c8cb4d178d5fb92b6543d63fa409eb6430b Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Wed, 4 Jun 2025 21:05:03 -0400
Subject: changed google authentication to not reload the page.

---
 src/client/util/SettingsManager.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/util/SettingsManager.tsx')

diff --git a/src/client/util/SettingsManager.tsx b/src/client/util/SettingsManager.tsx
index 9e79fd870..f54dea90c 100644
--- a/src/client/util/SettingsManager.tsx
+++ b/src/client/util/SettingsManager.tsx
@@ -40,7 +40,7 @@ export class SettingsManager extends React.Component<object> {
     @observable private _activeTab = 'Accounts';
     @observable private _isOpen = false;
 
-    private googleAuthorize = action(() => GoogleAuthenticationManager.Instance.fetchOrGenerateAccessToken(true));
+    private googleAuthorize = action(() => GoogleAuthenticationManager.Instance.fetchOrGenerateAccessToken());
 
     public closeMgr = action(() => {
         this._isOpen = false;
-- 
cgit v1.2.3-70-g09d2

