From 81ae5175aebf7e14a781a73d4a7cbaec0b8f3e4a Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Mon, 9 Aug 2021 14:26:14 -0400
Subject: fixed augment only text to resize correctly with autoheight. fixed
 acls to cache correctly for new documents. fixed links to be shared across
 users.  fixed links to always default to public.

---
 src/client/util/SettingsManager.tsx | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'src/client/util/SettingsManager.tsx')

diff --git a/src/client/util/SettingsManager.tsx b/src/client/util/SettingsManager.tsx
index 3987497b8..bd91db779 100644
--- a/src/client/util/SettingsManager.tsx
+++ b/src/client/util/SettingsManager.tsx
@@ -268,7 +268,8 @@ export class SettingsManager extends React.Component<{}> {
                 <div className="tab-column-content">
                     <button onClick={() => GroupManager.Instance?.open()}>Manage groups</button>
                     <div className="default-acl">
-                        <input className="acl-check" type="checkbox" checked={BoolCast(Doc.UserDoc()?.defaultAclPrivate)} onChange={action(() => Doc.UserDoc().defaultAclPrivate = !Doc.UserDoc().defaultAclPrivate)} />
+                        <input className="acl-check" type="checkbox" checked={BoolCast(Doc.UserDoc()?.defaultAclPrivate)}
+                            onChange={action(() => Doc.UserDoc().defaultAclPrivate = !Doc.UserDoc().defaultAclPrivate)} />
                         <div className="acl-text">Default access private</div>
                     </div>
                 </div>
-- 
cgit v1.2.3-70-g09d2

