From 4e715d6261487602a32e7182d2bc89817bf76527 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Fri, 21 Aug 2020 22:29:25 -0400
Subject: fixed stacking view to use autoHeight to avoid having scroll bars. 
 changed some names (inactive instead of recentlyClosed). switched to untitled
 Tabs from Untitled Collection

---
 src/client/views/DocComponent.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/views/DocComponent.tsx')

diff --git a/src/client/views/DocComponent.tsx b/src/client/views/DocComponent.tsx
index 23ce71c4f..d621a792b 100644
--- a/src/client/views/DocComponent.tsx
+++ b/src/client/views/DocComponent.tsx
@@ -131,7 +131,7 @@ export function ViewBoxAnnotatableComponent<P extends ViewBoxAnnotatableProps, T
                 const toRemove = value.filter(v => docs.includes(v));
 
                 if (toRemove.length !== 0) {
-                    const recent = Cast(Doc.UserDoc().myRecentlyClosed, Doc) as Doc;
+                    const recent = Cast(Doc.UserDoc().myInactiveDocs, Doc) as Doc;
                     toRemove.forEach(doc => {
                         Doc.RemoveDocFromList(targetDataDoc, this.props.fieldKey + "-annotations", doc);
                         recent && Doc.AddDocToList(recent, "data", doc, undefined, true, true);
-- 
cgit v1.2.3-70-g09d2

