From ff2602bb598b6e82330a9a0b2453e44d70c94c39 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Fri, 4 Mar 2022 15:19:09 -0500
Subject: removed pseudo Doc type system. playing with hot reloading.

---
 src/client/views/Main.tsx | 16 +++++++++-------
 1 file changed, 9 insertions(+), 7 deletions(-)

(limited to 'src/client/views/Main.tsx')

diff --git a/src/client/views/Main.tsx b/src/client/views/Main.tsx
index 7553c8118..8560ccb29 100644
--- a/src/client/views/Main.tsx
+++ b/src/client/views/Main.tsx
@@ -1,13 +1,15 @@
-import { MainView } from "./MainView";
-import { Docs } from "../documents/Documents";
-import { CurrentUserUtils } from "../util/CurrentUserUtils";
-import * as ReactDOM from 'react-dom';
+// if ((module as any).hot) {
+//     (module as any).hot.accept();
+// }
+
 import * as React from 'react';
-import { DocServer } from "../DocServer";
+import * as ReactDOM from 'react-dom';
 import { AssignAllExtensions } from "../../extensions/General/Extensions";
-import { Networking } from "../Network";
-import { CollectionView } from "./collections/CollectionView";
+import { Docs } from "../documents/Documents";
+import { CurrentUserUtils } from "../util/CurrentUserUtils";
 import { LinkManager } from "../util/LinkManager";
+import { CollectionView } from "./collections/CollectionView";
+import { MainView } from "./MainView";
 
 AssignAllExtensions();
 
-- 
cgit v1.2.3-70-g09d2

