From 004335fc4052205d6972b3f9efa8b65e5d384006 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Mon, 7 Sep 2020 11:59:52 -0400
Subject: fully disabled scrolling on MainView which should always be unwanted

---
 src/client/views/MainView.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/client/views/MainView.tsx')

diff --git a/src/client/views/MainView.tsx b/src/client/views/MainView.tsx
index f9b3b1da8..318d0368c 100644
--- a/src/client/views/MainView.tsx
+++ b/src/client/views/MainView.tsx
@@ -82,6 +82,7 @@ export class MainView extends React.Component {
     propertiesWidth = () => Math.max(0, Math.min(this._panelWidth - 50, CurrentUserUtils.propertiesWidth || 0));
 
     componentDidMount() {
+        document.getElementById("root")?.addEventListener("scroll", e => document.getElementById("root")!.scrollTop = 0);
         new InkStrokeProperties();
         this._sidebarContent.proto = undefined;
         DocServer.setPlaygroundFields(["dataTransition", "_viewTransition", "_panX", "_panY", "_viewScale", "_viewType", "_chromeStatus"]); // can play with these fields on someone else's
-- 
cgit v1.2.3-70-g09d2

