From 627c2aa72f61a888866840810a7d31cb0648437b Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Fri, 28 Oct 2022 14:14:05 -0400
Subject: fixed proxyfields to use cache if it's available which saves orders
 of magnitude opening up Files list.   Fixed copying docs to appear in Files
 list.  fixed undo for change perspective and header color

---
 src/client/views/MainView.tsx | 7 ++-----
 1 file changed, 2 insertions(+), 5 deletions(-)

(limited to 'src/client/views/MainView.tsx')

diff --git a/src/client/views/MainView.tsx b/src/client/views/MainView.tsx
index 4dc1ebd99..052846e71 100644
--- a/src/client/views/MainView.tsx
+++ b/src/client/views/MainView.tsx
@@ -841,15 +841,12 @@ export class MainView extends React.Component {
     }
 
     expandFlyout = action((button: Doc) => {
-        // bcz: What's going on here!?
+        // bcz: What's going on here!? --- may be fixed now, so commenting out ...
         // Chrome(not firefox) seems to have a bug when the flyout expands and there's a zoomed freeform tab.  All of the div below the CollectionFreeFormView's main div
         // generate the wrong value from getClientRectangle() -- specifically they return an 'x' that is the flyout's width greater than it should be.
         // interactively adjusting the flyout fixes the problem.  So does programmatically changing the value after a timeout to something *fractionally* different (ie, 1.5, not 1);)
         this._leftMenuFlyoutWidth = this._leftMenuFlyoutWidth || 250;
-        setTimeout(
-            action(() => (this._leftMenuFlyoutWidth += 0.5)),
-            0
-        );
+        //setTimeout(action(() => (this._leftMenuFlyoutWidth += 0.5)));
 
         this._sidebarContent.proto = button.target as any;
         this.LastButton = button;
-- 
cgit v1.2.3-70-g09d2

