From a3839d4b5a2180e2e80fa79f6eb4459e2976f380 Mon Sep 17 00:00:00 2001
From: Bob Zeleznik <zzzman@gmail.com>
Date: Mon, 11 May 2020 14:59:54 -0400
Subject: changed Cors behavior for WebBox(On for everything except
 GoogldDocs).  Update Freeze to work for ctrl-resizing text, and showing full
 screen.  reorged context menus.

---
 src/client/views/MainView.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/client/views/MainView.tsx')

diff --git a/src/client/views/MainView.tsx b/src/client/views/MainView.tsx
index cbaae63bc..560dd5d11 100644
--- a/src/client/views/MainView.tsx
+++ b/src/client/views/MainView.tsx
@@ -249,6 +249,7 @@ export class MainView extends React.Component {
             _width: this._panelWidth * .7,
             _height: this._panelHeight,
             title: "Collection " + workspaceCount,
+            _LODdisable: true
         };
         const freeformDoc = CurrentUserUtils.GuestTarget || Docs.Create.FreeformDocument([], freeformOptions);
         const mainDoc = Docs.Create.StandardCollectionDockingDocument([{ doc: freeformDoc, initialWidth: 600, path: [Doc.UserDoc().myCatalog as Doc] }], { title: `Workspace ${workspaceCount}` }, id, "row");
-- 
cgit v1.2.3-70-g09d2

