From dc0ecb47cd4e63e4861b79c00fe131de4450f46b Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Tue, 26 Jul 2022 09:27:12 -0400
Subject: turned off resetriting text box resizing to max of scroll height. 
 fixed placement/behavior of sidebar anno button for text.

---
 src/client/views/MainView.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/client/views/MainView.tsx')

diff --git a/src/client/views/MainView.tsx b/src/client/views/MainView.tsx
index 7e032af5e..a85460137 100644
--- a/src/client/views/MainView.tsx
+++ b/src/client/views/MainView.tsx
@@ -159,6 +159,7 @@ export class MainView extends React.Component {
                 'viewTransition',
                 'panX',
                 'panY',
+                'fitWidth',
                 'nativeWidth',
                 'nativeHeight',
                 'text-scrollHeight',
-- 
cgit v1.2.3-70-g09d2

