From 9e1234abe64d289927122ad641e3bcaf0b9eaf6e Mon Sep 17 00:00:00 2001
From: Bob Zeleznik <zzzman@gmail.com>
Date: Tue, 1 Oct 2019 02:54:03 -0400
Subject: bugs, bugs.  this time with fittobox when called from schema view
 which was passing width and height as functions, not values.  switched to
 PanelWidth and PanelHeight

---
 src/client/views/collections/CollectionTreeView.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'src/client/views/collections/CollectionTreeView.tsx')

diff --git a/src/client/views/collections/CollectionTreeView.tsx b/src/client/views/collections/CollectionTreeView.tsx
index 6ce5d8e20..ffd1f9170 100644
--- a/src/client/views/collections/CollectionTreeView.tsx
+++ b/src/client/views/collections/CollectionTreeView.tsx
@@ -327,8 +327,8 @@ class TreeView extends React.Component<TreeViewProps> {
                     showOverlays={this.noOverlays}
                     ruleProvider={this.props.document.isRuleProvider && layoutDoc.type !== DocumentType.TEXT ? this.props.document : this.props.ruleProvider}
                     fitToBox={this.boundsOfCollectionDocument !== undefined}
-                    width={this.docWidth}
-                    height={this.docHeight}
+                    PanelWidth={this.docWidth}
+                    PanelHeight={this.docHeight}
                     getTransform={this.docTransform}
                     CollectionDoc={this.props.containingCollection}
                     CollectionView={undefined}
-- 
cgit v1.2.3-70-g09d2

