From 33299a19d86948051eef442825c0b3241d1ac619 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Mon, 24 Apr 2023 11:55:53 -0400
Subject: fixed isContentActive=false to apply to stacking collections. fixed
 pile view to be faster and to work in fit content panels. fixed issues with
 hidden docs and freeformviews that act as lightboxes - hidden docs can be
 shown as the lightbox doc without modifying the hidden flag to allow
 collection state to be restored.

---
 src/client/views/collections/CollectionView.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/client/views/collections/CollectionView.tsx')

diff --git a/src/client/views/collections/CollectionView.tsx b/src/client/views/collections/CollectionView.tsx
index 790aa765d..b76033a0c 100644
--- a/src/client/views/collections/CollectionView.tsx
+++ b/src/client/views/collections/CollectionView.tsx
@@ -46,6 +46,7 @@ interface CollectionViewProps_ extends FieldViewProps {
     // property overrides for child documents
     childDocuments?: Doc[]; // used to override the documents shown by the sub collection to an explicit list (see LinkBox)
     childDocumentsActive?: () => boolean | undefined; // whether child documents can be dragged if collection can be dragged (eg., in a when a Pile document is in startburst mode)
+    childContentsActive?: () => boolean | undefined;
     childFitWidth?: (child: Doc) => boolean;
     childShowTitle?: () => string;
     childOpacity?: () => number;
-- 
cgit v1.2.3-70-g09d2

