From 650cc00d18c97f89aef77f50703aa9b525dd0368 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Fri, 14 Apr 2023 11:12:49 -0400
Subject: got rid of CollectionView prop.  fixed DocFocusOrOpen to toggle
 targets and zoom correctly.

---
 src/client/views/collections/TabDocView.tsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/client/views/collections/TabDocView.tsx')

diff --git a/src/client/views/collections/TabDocView.tsx b/src/client/views/collections/TabDocView.tsx
index ef8f395c5..4bbc3bb44 100644
--- a/src/client/views/collections/TabDocView.tsx
+++ b/src/client/views/collections/TabDocView.tsx
@@ -577,7 +577,6 @@ export class TabMinimapView extends React.Component<TabMinimapViewProps> {
             <div className="miniMap" style={{ width: miniSize, height: miniSize, background: this.props.background() }}>
                 <CollectionFreeFormView
                     Document={this.props.document}
-                    CollectionView={undefined}
                     docViewPath={returnEmptyDoclist}
                     childLayoutTemplate={this.childLayoutTemplate} // bcz: Ugh .. should probably be rendering a CollectionView or the minimap should be part of the collectionFreeFormView to avoid having to set stuff like this.
                     noOverlay={true} // don't render overlay Docs since they won't scale
-- 
cgit v1.2.3-70-g09d2

