From fc533121302306e2be0cdf1957f7d60a6bc65097 Mon Sep 17 00:00:00 2001
From: Bob Zeleznik <zzzman@gmail.com>
Date: Tue, 11 Feb 2020 23:14:07 -0500
Subject: made default zoom to doc take up 3/4 of screen instead of 1/2

---
 .../views/collections/collectionFreeForm/CollectionFreeFormView.tsx     | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/views/collections/collectionFreeForm/CollectionFreeFormView.tsx')

diff --git a/src/client/views/collections/collectionFreeForm/CollectionFreeFormView.tsx b/src/client/views/collections/collectionFreeForm/CollectionFreeFormView.tsx
index 07a5a2c7b..8f0486b5b 100644
--- a/src/client/views/collections/collectionFreeForm/CollectionFreeFormView.tsx
+++ b/src/client/views/collections/collectionFreeForm/CollectionFreeFormView.tsx
@@ -697,7 +697,7 @@ export class CollectionFreeFormView extends CollectionSubView(PanZoomDocument) {
 
     }
 
-    setScaleToZoom = (doc: Doc, scale: number = 0.5) => {
+    setScaleToZoom = (doc: Doc, scale: number = 0.75) => {
         this.Document.scale = scale * Math.min(this.props.PanelWidth() / NumCast(doc._width), this.props.PanelHeight() / NumCast(doc._height));
     }
 
-- 
cgit v1.2.3-70-g09d2

