From 8ceaba8b8264f5519de732cc603dcd276b4b4f4d Mon Sep 17 00:00:00 2001
From: Nathan-SR <144961007+Nathan-SR@users.noreply.github.com>
Date: Fri, 28 Jun 2024 01:49:10 -0400
Subject: header text no longer shifts left on hover

---
 src/client/views/collections/collectionSchema/SchemaRowBox.tsx | 6 +-----
 1 file changed, 1 insertion(+), 5 deletions(-)

(limited to 'src/client/views/collections/collectionSchema/SchemaRowBox.tsx')

diff --git a/src/client/views/collections/collectionSchema/SchemaRowBox.tsx b/src/client/views/collections/collectionSchema/SchemaRowBox.tsx
index c9feeac6b..077d95c57 100644
--- a/src/client/views/collections/collectionSchema/SchemaRowBox.tsx
+++ b/src/client/views/collections/collectionSchema/SchemaRowBox.tsx
@@ -97,10 +97,6 @@ export class SchemaRowBox extends ViewBoxBaseComponent<SchemaRowBoxProps>() {
         return ''
     }
 
-    @computed get refSelectModeInfo() {
-        return this.schemaView._referenceSelectMode;
-    }
-
     @computed get menuInfos() {
         const infos: Array<IconProp> = [];
         if (this.Document._lockedSchemaEditing) infos.push('lock');
@@ -178,7 +174,7 @@ export class SchemaRowBox extends ViewBoxBaseComponent<SchemaRowBoxProps>() {
                     {this.schemaView?.columnKeys?.map((key, index) => (
                         <SchemaTableCell
                             selectReference={this.selectReference}
-                            refSelectModeInfo={this.refSelectModeInfo}
+                            refSelectModeInfo={this.schemaView._referenceSelectMode}
                             eqHighlightFunc={this.eqHighlightFunc}
                             equationHighlightRef={this.schemaView._cellHighlightColors}
                             highlightCells={this.highlightCells}
-- 
cgit v1.2.3-70-g09d2

