From bc550e43b6042176cf59f04cbff51e1b21adaa8a Mon Sep 17 00:00:00 2001
From: mehekj <mehek.jethani@gmail.com>
Date: Thu, 27 Apr 2023 00:41:43 -0400
Subject: trying to get schema keyboard controls working

---
 src/client/views/collections/collectionSchema/SchemaRowBox.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/client/views/collections/collectionSchema/SchemaRowBox.tsx')

diff --git a/src/client/views/collections/collectionSchema/SchemaRowBox.tsx b/src/client/views/collections/collectionSchema/SchemaRowBox.tsx
index 79808d8f8..f5a16cec0 100644
--- a/src/client/views/collections/collectionSchema/SchemaRowBox.tsx
+++ b/src/client/views/collections/collectionSchema/SchemaRowBox.tsx
@@ -123,6 +123,7 @@ export class SchemaRowBox extends ViewBoxBaseComponent<FieldViewProps>() {
                         <SchemaTableCell
                             key={key}
                             Document={this.rootDoc}
+                            col={index}
                             schemaView={this.schemaView}
                             fieldKey={key}
                             columnWidth={this.schemaView?.displayColumnWidths[index] ?? CollectionSchemaView._minColWidth}
-- 
cgit v1.2.3-70-g09d2

