From 0dd3bbfc119d48bd2c32f8e55b7051e3ddc530c3 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Tue, 21 Jun 2022 14:40:04 -0400
Subject: restored experimental templates.  fixed (enabled) pointer events on
 nested column/row views when container is active.  got rid of
 freezeDimensions which wasn't needed and introduced artifacts for views that
 set it (timeView, GridView)

---
 src/client/views/collections/collectionSchema/SchemaTable.tsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/client/views/collections/collectionSchema/SchemaTable.tsx')

diff --git a/src/client/views/collections/collectionSchema/SchemaTable.tsx b/src/client/views/collections/collectionSchema/SchemaTable.tsx
index bea5b3be6..43266a571 100644
--- a/src/client/views/collections/collectionSchema/SchemaTable.tsx
+++ b/src/client/views/collections/collectionSchema/SchemaTable.tsx
@@ -574,7 +574,6 @@ export class SchemaTable extends React.Component<SchemaTableProps> {
                         DataDoc={this._showDataDoc}
                         styleProvider={DefaultStyleProvider}
                         docViewPath={returnEmptyDoclist}
-                        freezeDimensions={true}
                         focus={DocUtils.DefaultFocus}
                         renderDepth={this.props.renderDepth}
                         rootSelected={returnFalse}
-- 
cgit v1.2.3-70-g09d2

