From b1044d1d79c1e06769f74df514e12557426b67be Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Fri, 26 Aug 2022 16:16:21 -0400
Subject: trying to clean up transition times for presbox / jumptoDoc, etc.

---
 src/client/views/nodes/CollectionFreeFormDocumentView.tsx | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/client/views/nodes/CollectionFreeFormDocumentView.tsx')

diff --git a/src/client/views/nodes/CollectionFreeFormDocumentView.tsx b/src/client/views/nodes/CollectionFreeFormDocumentView.tsx
index 82557d36b..c07772b53 100644
--- a/src/client/views/nodes/CollectionFreeFormDocumentView.tsx
+++ b/src/client/views/nodes/CollectionFreeFormDocumentView.tsx
@@ -226,6 +226,7 @@ export class CollectionFreeFormDocumentView extends DocComponent<CollectionFreeF
             PanelWidth: this.panelWidth,
             PanelHeight: this.panelHeight,
         };
+        console.log('WIdth = ' + this.panelWidth() + ' ' + this.dataProvider?.transition);
         return (
             <div
                 className={'collectionFreeFormDocumentView-container'}
-- 
cgit v1.2.3-70-g09d2

