From bc23e69a88234c213e444b1aa3c5eb895c35aca9 Mon Sep 17 00:00:00 2001
From: Bob Zeleznik <zzzman@gmail.com>
Date: Mon, 6 Apr 2020 00:23:19 -0400
Subject: many more fixes to nativewidth/height layout changes.

---
 src/client/views/nodes/CollectionFreeFormDocumentView.tsx | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'src/client/views/nodes/CollectionFreeFormDocumentView.tsx')

diff --git a/src/client/views/nodes/CollectionFreeFormDocumentView.tsx b/src/client/views/nodes/CollectionFreeFormDocumentView.tsx
index e4c8bbd7b..7e9e654cd 100644
--- a/src/client/views/nodes/CollectionFreeFormDocumentView.tsx
+++ b/src/client/views/nodes/CollectionFreeFormDocumentView.tsx
@@ -10,7 +10,6 @@ import { DocumentView, DocumentViewProps } from "./DocumentView";
 import React = require("react");
 import { PositionDocument } from "../../../new_fields/documentSchemas";
 import { TraceMobx } from "../../../new_fields/util";
-import { returnFalse } from "../../../Utils";
 import { ContentFittingDocumentView } from "./ContentFittingDocumentView";
 
 export interface CollectionFreeFormDocumentViewProps extends DocumentViewProps {
@@ -108,7 +107,7 @@ export class CollectionFreeFormDocumentView extends DocComponent<CollectionFreeF
                     getTransform={this.getTransform}
                     NativeHeight={this.NativeHeight}
                     NativeWidth={this.NativeWidth}
-                    active={returnFalse}
+                    active={this.props.parentActive}
                     focus={this.focusDoc}
                     PanelWidth={this.panelWidth}
                     PanelHeight={this.panelHeight}
-- 
cgit v1.2.3-70-g09d2

