From 13a25017e2e4ff9158fa3c9181db0ec7b93b5f7f Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Sat, 21 Nov 2020 10:47:47 -0500
Subject: turned off automatic  loading of non-active tabs. fixed placement of
 contentfittingview content for link preview of web/pdf etc (was vertically
 displaced).  turned off javascript in webBox's.

---
 src/client/views/nodes/ContentFittingDocumentView.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/views/nodes/ContentFittingDocumentView.tsx')

diff --git a/src/client/views/nodes/ContentFittingDocumentView.tsx b/src/client/views/nodes/ContentFittingDocumentView.tsx
index d963369f8..5c2a7843f 100644
--- a/src/client/views/nodes/ContentFittingDocumentView.tsx
+++ b/src/client/views/nodes/ContentFittingDocumentView.tsx
@@ -47,7 +47,7 @@ export class ContentFittingDocumentView extends React.Component<DocumentViewProp
     private getTransform = () => this.props.ScreenToLocalTransform().
         translate(this.props.dontCenter?.includes("x") ? 0 : -this.centeringOffset, this.props.dontCenter?.includes("y") ? 0 : -this.centeringYOffset)
     private get centeringOffset() { return this.nativeWidth && !this.props.Document._fitWidth ? (this.props.PanelWidth() - this.nativeWidth * this.nativeScaling) / 2 : 0; }
-    private get centeringYOffset() { return Math.abs(this.centeringOffset) < 0.001 && this.nativeHeight ? (this.props.PanelHeight() - this.nativeHeight * this.nativeScaling) / 2 : 0; }
+    private get centeringYOffset() { return this.nativeWidth && Math.abs(this.centeringOffset) < 0.001 && this.nativeHeight ? (this.props.PanelHeight() - this.nativeHeight * this.nativeScaling) / 2 : 0; }
 
     @computed get borderRounding() { return StrCast(this.props.Document?.borderRounding); }
 
-- 
cgit v1.2.3-70-g09d2

