From 53d456afb43b70cc240bc6a37094fa37cfe37436 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Thu, 12 Oct 2023 11:24:19 -0400
Subject: performance fixes to reduce re-rendering : moved link brushing out of
 Doc's highlighting and into Annotation.tsx, stopped freeformview from
 rerendering whenever its invalidated by not always setting layoutElements to
 a new list.

---
 src/client/views/nodes/ImageBox.tsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/client/views/nodes/ImageBox.tsx')

diff --git a/src/client/views/nodes/ImageBox.tsx b/src/client/views/nodes/ImageBox.tsx
index 1ab120af5..2f4f788d4 100644
--- a/src/client/views/nodes/ImageBox.tsx
+++ b/src/client/views/nodes/ImageBox.tsx
@@ -526,7 +526,6 @@ export class ImageBox extends ViewBoxAnnotatableComponent<ViewBoxAnnotatableProp
                     }
                 })}
                 style={{
-                    display: !this.props.isContentActive() && this.props.thumbShown?.() ? 'none' : undefined,
                     width: this.props.PanelWidth() ? undefined : `100%`,
                     height: this.props.PanelWidth() ? undefined : `100%`,
                     pointerEvents: this.layoutDoc._lockedPosition ? 'none' : undefined,
-- 
cgit v1.2.3-70-g09d2

