From 7b668e5c4ee804aa6363e635f2a24a9683d7b803 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Mon, 21 Aug 2023 13:23:33 -0400
Subject: got rid of transition time for images .. default duration should be
 sufficient?

---
 src/client/views/nodes/ImageBox.tsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/client/views/nodes/ImageBox.tsx')

diff --git a/src/client/views/nodes/ImageBox.tsx b/src/client/views/nodes/ImageBox.tsx
index c7ccd1ea0..44da98f75 100644
--- a/src/client/views/nodes/ImageBox.tsx
+++ b/src/client/views/nodes/ImageBox.tsx
@@ -82,7 +82,6 @@ export class ImageBox extends ViewBoxAnnotatableComponent<ViewBoxAnnotatableProp
                 config_panX: NumCast(this.layoutDoc._freeform_panX),
                 config_panY: NumCast(this.layoutDoc._freeform_panY),
                 config_viewScale: Cast(this.layoutDoc._freeform_scale, 'number', null),
-                presentation_transition: 1000,
                 annotationOn: this.rootDoc,
             });
         if (anchor) {
-- 
cgit v1.2.3-70-g09d2

