From c360dc0adb468ae3aaa1c2d943606993d01a5a52 Mon Sep 17 00:00:00 2001
From: Bob Zeleznik <zzzman@gmail.com>
Date: Sat, 27 Jul 2019 11:08:44 -0400
Subject: fixed handling of keyboard events to avoid triggering global key
 events. made BoolCast default to false. fixed templating to deal with
 conflict between field fields and template fields

---
 src/client/views/nodes/LinkMenuItem.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/views/nodes/LinkMenuItem.tsx')

diff --git a/src/client/views/nodes/LinkMenuItem.tsx b/src/client/views/nodes/LinkMenuItem.tsx
index a0c37a719..d4c92c9f2 100644
--- a/src/client/views/nodes/LinkMenuItem.tsx
+++ b/src/client/views/nodes/LinkMenuItem.tsx
@@ -7,7 +7,7 @@ import { undoBatch } from "../../util/UndoManager";
 import './LinkMenu.scss';
 import React = require("react");
 import { Doc } from '../../../new_fields/Doc';
-import { StrCast, Cast, BoolCast, FieldValue, NumCast } from '../../../new_fields/Types';
+import { StrCast, Cast, FieldValue, NumCast } from '../../../new_fields/Types';
 import { observable, action } from 'mobx';
 import { LinkManager } from '../../util/LinkManager';
 import { DragLinkAsDocument } from '../../util/DragManager';
-- 
cgit v1.2.3-70-g09d2

