From d818ef151ca65008e5c6bb5e92b709decb3026d8 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Mon, 14 Apr 2025 18:35:49 -0400
Subject: fixed how templates are expanded to avoid template sub-component
 conflicts by changing how field keys are named.   fixed various Cast
 functions to be more typesafe by including undefined as part of return type. 
 overhaul of Doc.MakeClone, MakeCopy, FindRefernces - makeClone is no longer
 async.  fixed inlined docs in text docs.

---
 src/client/views/nodes/ScreenshotBox.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/views/nodes/ScreenshotBox.tsx')

diff --git a/src/client/views/nodes/ScreenshotBox.tsx b/src/client/views/nodes/ScreenshotBox.tsx
index 999f9c1cd..4f02d68d6 100644
--- a/src/client/views/nodes/ScreenshotBox.tsx
+++ b/src/client/views/nodes/ScreenshotBox.tsx
@@ -284,7 +284,7 @@ export class ScreenshotBox extends ViewBoxAnnotatableComponent<FieldViewProps>()
     setupDictation = () => {
         if (this.dataDoc[this.fieldKey + '_dictation']) return;
         const dictationText = DocUtils.GetNewTextDoc('dictation', NumCast(this.Document.x), NumCast(this.Document.y) + NumCast(this.layoutDoc._height) + 10, NumCast(this.layoutDoc._width), 2 * NumCast(this.layoutDoc._height));
-        const textField = Doc.LayoutFieldKey(dictationText);
+        const textField = Doc.LayoutDataKey(dictationText);
         dictationText._layout_autoHeight = false;
         const dictationTextProto = dictationText[DocData];
         dictationTextProto[`${textField}_recordingSource`] = this.dataDoc;
-- 
cgit v1.2.3-70-g09d2

