From 8d9b38b64e61f2afb2b698004bcef7017d454078 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Mon, 14 Dec 2020 14:22:44 -0500
Subject: got rid of fitDocToPanel.  made collectionFreeFormDocView always use
 a ContentFittingDocView.  fixed up web box selections.

---
 src/client/views/nodes/formattedText/FormattedTextBoxComment.tsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/client/views/nodes/formattedText/FormattedTextBoxComment.tsx')

diff --git a/src/client/views/nodes/formattedText/FormattedTextBoxComment.tsx b/src/client/views/nodes/formattedText/FormattedTextBoxComment.tsx
index a80314f74..447ff5865 100644
--- a/src/client/views/nodes/formattedText/FormattedTextBoxComment.tsx
+++ b/src/client/views/nodes/formattedText/FormattedTextBoxComment.tsx
@@ -297,7 +297,6 @@ export class FormattedTextBoxComment {
                                     <div className="FormattedTextBoxComment-preview-wrapper">
                                         <ContentFittingDocumentView
                                             Document={target}
-                                            fitDocToPanel={true}
                                             moveDocument={returnFalse}
                                             rootSelected={returnFalse}
                                             ScreenToLocalTransform={Transform.Identity}
-- 
cgit v1.2.3-70-g09d2

