From cb2323bd828c564aa0847d6f172c452893f80098 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Fri, 16 May 2025 14:03:23 -0400
Subject: made pdf buttons maintain scren size.

---
 src/client/views/pdf/PDFViewer.tsx | 6 ------
 1 file changed, 6 deletions(-)

(limited to 'src/client/views/pdf/PDFViewer.tsx')

diff --git a/src/client/views/pdf/PDFViewer.tsx b/src/client/views/pdf/PDFViewer.tsx
index fc2567fbc..97fe183dd 100644
--- a/src/client/views/pdf/PDFViewer.tsx
+++ b/src/client/views/pdf/PDFViewer.tsx
@@ -359,12 +359,6 @@ export class PDFViewer extends ObservableReactComponent<IViewerProps> {
 
     @action
     onPointerDown = (e: React.PointerEvent): void => {
-        // const hit = document.elementFromPoint(e.clientX, e.clientY);
-        // bcz: Change. drag selecting requires that preventDefault is NOT called.  This used to happen in DocumentView,
-        //      but that's changed, so this shouldn't be needed.
-        // if (hit && hit.localName === "span" && this.annotationsActive(true)) {  // drag selecting text stops propagation
-        //     e.button === 0 && e.stopPropagation();
-        // }
         // if alt+left click, drag and annotate
         this._downX = e.clientX;
         this._downY = e.clientY;
-- 
cgit v1.2.3-70-g09d2

