From 47d55dcaf8b776fa2ba4272e1ae8fa2e5ef87ee4 Mon Sep 17 00:00:00 2001
From: bobzel <zzzman@gmail.com>
Date: Wed, 16 Jul 2025 11:31:49 -0400
Subject: fixed disappearing images caused by having no height when default
 image was an alternate.  fixed columnDragger for masonry view to always
 display to avoid flicker artifacts.

---
 src/client/views/smartdraw/DrawingFillHandler.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/client/views/smartdraw/DrawingFillHandler.tsx')

diff --git a/src/client/views/smartdraw/DrawingFillHandler.tsx b/src/client/views/smartdraw/DrawingFillHandler.tsx
index f773957e7..e9e3335f9 100644
--- a/src/client/views/smartdraw/DrawingFillHandler.tsx
+++ b/src/client/views/smartdraw/DrawingFillHandler.tsx
@@ -62,7 +62,7 @@ export class DrawingFillHandler {
                                         ai_prompt: newPrompt,
                                         tags: new List<string>(['@ai']),
                                         title: newPrompt,
-                                        _data_usePath: 'alternate:hover',
+                                        //_data_usePath: 'alternate:hover',
                                         data_alternates: new List<Doc>([drawing]),
                                         _width: 500,
                                         data_nativeWidth: info.nativeWidth,
-- 
cgit v1.2.3-70-g09d2

